OEM Micropipette Suppliers Hyderabad

royalhoki77

slot deposit 5k

situs slot777

slot hoki

slot deposit pulsa

madridtoto

slot deposit pulsa

OEM Micropipette Suppliers Hyderabad – Trusted OEM Partner for Premium Micropipettes Across India

The demand for reliable and high-precision laboratory instruments is growing in Hyderabad, one of India’s leading biotechnology and pharmaceutical hubs. Among these essential tools, micropipettes play a critical role in molecular biology, diagnostics, clinical research, and pharmaceutical development. For labs and distributors seeking quality, affordability, and reliable branding solutions, Singh Science Systems stands out as one of the most trusted OEM Micropipette Suppliers in Hyderabad and across India.

Hyderabad’s research ecosystem—spanning Genome Valley, HITEC City, Kukatpally, Gachibowli, Tarnaka, and Kachiguda—requires world-class pipetting tools for accurate and consistent liquid handling. As a leading OEM manufacturer, we design and supply high-performance micropipettes under private label and custom branding options to distributors, biotech companies, diagnostic chains, hospitals, and academic institutions.

Phone: 9266169685
Email: care@ssciences.com
Website: www.ssciences.com

Why Ssciences is the Leading OEM Micropipette Supplier in Hyderabad

1. Custom OEM Branding for Distributors & Institutions

We specialize in private-label micropipette manufacturing with:

Custom logo printing

Body color variations

Branding on packaging

Model customization

Serial number & barcode options

Distributor-specific specifications

2. High Accuracy & ISO-Compliant Calibration

All our micropipettes are engineered to meet ISO 8655 guidelines and ensure:

Excellent accuracy

Smooth piston movement

Long-term stability

Low pipetting fatigue

Reliable results for routine & advanced lab applications

3. Strong Presence in All Major Indian Cities

Apart from Hyderabad, we supply OEM micropipettes in:

Chennai

Bangalore

Mumbai

Delhi NCR

Pune

Kolkata

Ahmedabad

Coimbatore

Chandigarh

Jaipur

Surat

Lucknow

Indore

Nagpur

Guwahati

Raipur

Bhubaneswar

Vadodara

Visakhapatnam

Vijayawada

Many more cities across India

We ensure seamless delivery and OEM support regardless of your location.

4. Best OEM Pricing for Distributors

We offer competitive bulk pricing for:

Scientific distributors

Diagnostic kit manufacturers

OEM exporters

Government & private research institutions

Laboratory chains

5. Dedicated OEM Support and Fast Dispatch

Our team ensures:

Quick customization

Consistent supply

Fast shipping

Dedicated after-sales support

Warranty assistance

Our OEM Micropipette Range

Single Channel Micropipettes

Designed for precision and comfort in routine lab workflows.

Multichannel Micropipettes (8 & 12 Channel)

Essential for ELISA plates, PCR tests, microplate dispensing, immunoassays, and high-throughput workflows.

Volume Ranges Available

0.1–2 µL

2–20 µL

10–100 µL

20–200 µL

100–1000 µL

1–5 mL

5–10 mL

Included With Every OEM Micropipette

Calibration certificate

Unique serial number

Instruction manual

Manufacturer warranty

Custom packaging (if required)

OEM Micropipette Supply Across Hyderabad

Hyderabad has evolved into one of India’s most advanced scientific and pharmaceutical centers. We supply micropipettes across major localities, including:

Genome Valley (Shamirpet, Turkapally) – home to biotech, pharma & life sciences companies.

HITEC City – research centers & corporate labs.

Gachibowli – premium labs, healthcare startups & R&D units.

Kukatpally & Miyapur – academic and pharma labs.

Tarnaka & Uppal – major government and private research organizations.

Secunderabad & Kachiguda – diagnostic and clinical laboratories.

Whether you are located in a city core or the outskirts, we support a complete end-to-end OEM supply.

OEM Micropipettes for All Types of Laboratories

1. Academic & Research Institutions in Hyderabad

We supply OEM micropipettes to:

University of Hyderabad

JNTU

Osmania University

IIT Hyderabad

Private universities & biotechnology colleges

2. Pharma & Biotech Companies

Hyderabad is often referred to as India’s Pharmaceutical Capital. We supply pipettes for:

Drug development

Quality control labs

CROs

Biopharma research

Vaccine development units

3. Diagnostic Laboratories

Our micropipettes are widely used in:

PCR labs

Molecular diagnostic centers

Hospital pathology labs

National lab chains

4. Food, Agriculture & Environment Labs

OEM pipettes used for:

Sample testing

Culture studies

Analytical testing

R&D applications

OEM Micropipette Suppliers Hyderabad – Coverage Across Major Indian Cities

South India

Hyderabad

Bangalore

Chennai

Coimbatore

Trivandrum

Madurai

Mysore

Vijayawada

Visakhapatnam

West India

Mumbai

Pune

Nashik

Ahmedabad

Surat

Vadodara

North India

Delhi NCR

Chandigarh

Jaipur

Lucknow

Kanpur

Dehradun

East & Central India

Kolkata

Bhubaneswar

Patna

Ranchi

Raipur

Bhopal

Indore

This ensures our OEM partners have a continuous supply and nationwide product availability.

Why Distributors Choose Ssciences for OEM Micropipettes

Custom OEM/Private Label Branding
Affordable Pricing for Bulk Orders
Premium Quality & Durable Construction
Ergonomic & Low-Force Pipetting
ISO-Calibrated & Reliable Accuracy
Wide Volume Range Availability
Fast Pan-India Delivery
Dedicated OEM Partner Support

We help distributors grow faster by providing world-class instruments under their own brand names.

Contact – OEM Micropipette Suppliers Hyderabad

Partner with the most trusted OEM micropipette supplier in India and build your own lab equipment brand.

Phone: 9266169685
Email: care@ssciences.com
Website: www.ssciences.com

Whether you are in Hyderabad, Chennai, Mumbai, or any major city, we ensure superior quality, fast supply, and complete OEM support.