Bulk Liquid Transfer Pipette 5ml

royalhoki77

slot deposit 5k

situs slot777

slot hoki

slot deposit pulsa

madridtoto

slot deposit pulsa

Bulk Liquid Transfer Pipette 5ml – High Precision Laboratory Liquid Handling Solution

Introduction to Bulk Liquid Transfer Pipette 5ml

The Bulk Liquid Transfer Pipette 5ml is an essential laboratory instrument designed for accurate, fast, and contamination-free liquid transfer. Laboratories, pharmaceutical industries, research institutes, diagnostic centers, biotechnology facilities, and educational laboratories rely heavily on precision liquid handling equipment to maintain experimental accuracy and consistency.

At SSciences, we manufacture high-quality 5ml bulk liquid transfer pipettes engineered with advanced calibration systems, ergonomic design, and durable construction. Our pipettes are trusted by laboratories across India and internationally for reliable performance, repeatable results, and long operational life.

Whether handling reagents, buffers, culture media, chemicals, or biological samples, the Bulk Liquid Transfer Pipette 5ml ensures smooth and precise dispensing every time.

What is a Bulk Liquid Transfer Pipette 5ml?

A Bulk Liquid Transfer Pipette 5ml is a laboratory pipetting device specially designed to transfer larger liquid volumes efficiently without compromising precision. Unlike standard droppers or manual transfer tools, this pipette delivers controlled and calibrated liquid handling suitable for professional laboratory applications.

Key Functions:

Accurate 5ml liquid dispensing

Controlled aspiration and dispensing

Bulk sample handling

Reduced sample contamination

Consistent experimental results

This pipette is widely used in laboratories requiring repetitive liquid transfer in bulk quantities.

Key Features of SSciences Bulk Liquid Transfer Pipette 5ml

High Precision Calibration

Each pipette undergoes strict quality calibration to ensure accurate volume transfer according to laboratory standards.

Ergonomic Lightweight Design

Designed for comfortable single-hand operation, minimizing fatigue during continuous usage.

Durable Construction

Manufactured using high-grade materials resistant to chemicals, temperature variation, and frequent laboratory use.

Smooth Plunger Movement

Ensures uniform liquid aspiration and dispensing without leakage or pressure fluctuations.

Easy Maintenance

Simple disassembly allows easy cleaning, servicing, and long-term performance.

100% Made in India

Supporting Indian manufacturing with globally competitive quality standards.

Applications of Bulk Liquid Transfer Pipette 5ml

The Bulk Liquid Transfer Pipette 5ml is suitable for multiple industries:

Laboratory Research

Used in molecular biology, microbiology, chemistry, and biotechnology research labs.

Pharmaceutical Industry

Ideal for drug formulation, chemical handling, and quality control testing.

Diagnostic Laboratories

Perfect for pathology labs, sample preparation, and reagent transfer.

Educational Institutions

Used in colleges, universities, and training laboratories for student experiments.

Food & Beverage Testing

Helpful in quality analysis and contamination testing.

Environmental Laboratories

Applied in water testing, soil analysis, and pollution monitoring studies.

Advantages of Using Bulk Liquid Transfer Pipette 5ml

Using a high-quality transfer pipette significantly improves laboratory productivity.

Improves experiment accuracy

Reduces manual errors

Saves operational time

Prevents sample loss

Ensures repeatability

Enhances laboratory workflow efficiency

Bulk liquid handling becomes faster and safer with professionally engineered pipettes.

Why Choose SSciences Bulk Liquid Transfer Pipette 5ml?

SSciences is recognized as a trusted micropipette and laboratory equipment manufacturer in India. Our products are designed according to international laboratory requirements.

Our Strengths:

Advanced manufacturing technology

Strict quality inspection

OEM branding available

Competitive pricing for bulk orders

Fast nationwide delivery

Reliable customer support

We supply bulk quantities to distributors, hospitals, research centers, and institutional buyers.

Bulk Liquid Transfer Pipette 5ml Supplier Across India

SSciences supplies Bulk Liquid Transfer Pipette 5ml across all major cities and industrial regions of India. Our strong distribution network ensures quick delivery and technical support.

Major Cities Covered:

Delhi, New Delhi, Noida, Gurugram, Faridabad, Ghaziabad, Lucknow, Kanpur, Varanasi, Prayagraj, Agra, Meerut, Jaipur, Udaipur, Jodhpur, Kota, Ahmedabad, Surat, Vadodara, Rajkot, Mumbai, Navi Mumbai, Pune, Nagpur, Nashik, Aurangabad, Bengaluru, Mysuru, Chennai, Coimbatore, Madurai, Hyderabad, Secunderabad, Visakhapatnam, Vijayawada, Kochi, Trivandrum, Kolkata, Howrah, Bhubaneswar, Patna, Ranchi, Chandigarh, Mohali, Bhopal, Indore, Raipur, Guwahati, Dehradun, Shimla, Jammu and many more.

We ensure that laboratories across India receive premium laboratory pipettes without delay.

International Supply & Export

Apart from India, SSciences exports Bulk Liquid Transfer Pipette 5ml to several global markets:

Middle East (UAE, Saudi Arabia, Qatar, Oman)

South Asia

Africa

Southeast Asia

Europe laboratory distributors

Our export-quality products meet international laboratory performance standards.

Quality Standards & Certifications

Quality and precision remain our top priorities.

Our pipettes comply with:

CE Standards

ISO Manufacturing Practices

Laboratory Calibration Guidelines

International Quality Protocols

Every pipette is tested before dispatch to ensure flawless performance.

Technical Specifications (Typical)

Parameter | Specification
Volume Capacity | 5ml
Type | Bulk Liquid Transfer Pipette
Operation | Manual
Accuracy | High Precision
Material | Chemical Resistant
Calibration | Factory Calibrated
Application | Laboratory & Industrial

Maintenance Tips for Long Life

To maintain performance:

Use compatible pipette tips

Avoid over-pressing the plunger

Clean regularly after use

Store vertically in a pipette stand

Perform periodic calibration

Proper care increases lifespan and maintains measurement accuracy.

Bulk Purchase & OEM Branding

SSciences offers customized solutions for:

Laboratory distributors

Institutional tenders

Pharmaceutical companies

Research organizations

Private label branding (OEM)

Bulk buyers receive attractive pricing and fast production support.

Frequently Asked Questions (FAQ)

1. What is the use of the Bulk Liquid Transfer Pipette 5ml?

It is used for accurate transfer of liquid volumes up to 5ml in laboratories and research applications.

2. Is the pipette suitable for repetitive use?

Yes, it is designed specifically for repetitive bulk liquid handling.

3. Do you supply across India?

Yes, we deliver to all major Indian cities and remote locations.

4. Can I order in bulk quantity?

Absolutely. We specialize in bulk supply and OEM branding.

5. Is calibration included?

Yes, every pipette is factory-calibrated before shipment.

Conclusion

The Bulk Liquid Transfer Pipette 5ml from SSciences represents precision, durability, and reliability for modern laboratories. Designed for high-volume liquid transfer applications, it improves workflow efficiency while ensuring consistent results.

If you are looking for a trusted Bulk Liquid Transfer Pipette 5ml manufacturer and supplier in India, SSciences provides the perfect combination of quality, performance, and affordability.

Contact SSciences

Phone: +91 9266169685
Email: care@ssciences.com
Website: www.ssciences.com